Centrala alarma antiefractie Paradox Spectra SP 6000+K32+

Centrala alarma antiefractie Paradox Spectra SP 6000+K32+ la doar 594.51 lei!

Paradox Spectra SP6000 este o centrala alarma antiefractie, cu 8 zone, ce suporta armarea StayD pe bus cu 4 fire. Extensibila pana la 32 de zone, cu 8 intrari de zone sau 16 prin dublare ATZ. Un releu de alarma optional si intrare pentru detector de fum pe 2 fire. Poate suporta 32 de zone wireless prin conectare la RX1, iar programarea se realizeaza cu ajutorul software-ului BabyWare. De asemenea, are 2 partitii si 32 de coduri de utilizator. Sursa de alimentatie de pe placa suporta pana la 1.1 A si 4 PGM pe placa, cu un total de 16 PGM-uri. Actualizarea firmware-ului se realizeaza utilizand WinLoad. Carcasa metalica cu traf inclusa.

Categorie: Centrale Alarma Antiefractie
Subcategorie: Centrale Alarma Antiefractie
Brand: Paradox