Cleste taiat buloane hq 30″ (760 mm), DSH 140143

Cleste taiat buloane hq 30″ (760 mm), DSH 140143 la doar 152.14 lei!

Cod produs: 11276309
Producator: Venus DSH
Categorie: SCULE SI UNELTE/Scule de mana/Taiere si polizare/Cutite si cuttere izolate/Foarfeci de buloane

Descriere: Cleste taiat buloane hq 30″ (760 MM)Specificatii tehnice:Destinatie: taiat bolturi, buloane, otel beton, lacate, cablu, etc…Unealta robusta si usor de utilizat, dispozitivul de taiat buloane cu falci centrate beneficiaza de un mecanism de multiplicare de 80 de ori al fortei aplicate la maner. Spre exemplu, aplicand manerelor o forta de 25 kgf, se obtine o forta de taiere a falcilor de 2000 kgf.Falci forjate si durificate din otel aliat (Cr-V)Brate robuste din teava de otel protejate contra coroziunii prin vopsire în camp electrostaticManere cu protectie din PVC, cu forma ergonomica ce ofera confort sporit utilizatorului.Dimensiune cleste: 760 mm (30″)