Foarfeca taiat teava pvc 42 mm, DSH 140518

Foarfeca taiat teava pvc 42 mm, DSH 140518 la doar 38.67 lei!

Cod produs: 11275646
Producator: Venus DSH
Categorie: SCULE SI UNELTE/Constructii si reparatii/Scule instalatori/Dispozitive taiat tevi

Descriere: Foarfeca taiat teava pvc 42 mmSpecificatii foarfeca taiat teava:Utilizata pentru taierea tevilor din materiale plastice (PP, PVC), cu diametrul max. 42 mmManerele executate prin turnare din aliaj Al-Zn, grosime minima 3 mm, si vopsite în camp electrostaticLama taietoare executata din otel 65Mn cu grosime de 2.5 mm, cromataMecanismul de angrenare pas-cu-pas executat din tabla de otel, vopsit negru.