Detector de miscare PIR Bosch ISC-BPR2-WP12, 12 x 12 m, pet immunity, FSP

Detector de miscare PIR Bosch ISC-BPR2-WP12, 12 x 12 m, pet immunity, FSP la doar 117.09 lei!

Bosch ISC-BPR2-WP12 este un detector de miscare PIR care acopera o arie de detectie de 12 x 12 m. Dispune de pet immunity pentru 1 – 2 animale de pana la 20 kg, compensare dinamica a temperaturii si 2 lentile Fresnel, care ofera un model de densitate ridicata (77 zone) cu 7 straturi. De asemenea, utilizeaza procesare First Step (FSP) care raspunde aproape instantaneu la tintele umane fara a produce alarme false din alte surse. FSP ajusteaza sensibilitatea detectorului in functie de amplitudinea semnalului, polaritate, panta si sincronizare.

Categorie: Senzori de miscare interior
Subcategorie: Senzori de miscare interior
Brand: Bosch