Vata bazaltica Rockwool Acoustic, grosime 100 x 1200 x 600 mm

Placile din vata minerala bazaltica Acoustic de la Rockwool sunt semi-rigide si se utilizeaza pentru izolari termice si fonice. Sunt folosite pentru protectia fonica si izolarea termica a peretilor de compartimentare, a tavanelor suspendate, a fatadelor ventilate sau in cadrul sistemelor acustice. Acestea au grosimea de 100 mm, lungimea de 1200 mm si latimea de 600 mm. Avantaje: instalare rapida asigura fonoabsorbtie cand sunt folosite in cadrul sistemelor de pereti de compartimentare din gips

Producator: Rockwool

Categorie: Vata bazaltica

Cauti Vata bazaltica Rockwool Acoustic, grosime 100 x 1200 x 600 mm? Gasesti cele mai bune oferte pe vBank.ro.