Pulverizator cu acumulator HECHT 9415, volum rezervor 15 litri, compatibil cu acumulatori 2.5, 4.0, 5.0 Ah, fara acumulator si fara incarcator

Pulverizator cu acumulator HECHT 9415, volum rezervor 15 litri, compatibil cu acumulatori 2.5, 4.0, 5.0 Ah, fara acumulator si fara incarcator la doar 559.26 lei!

Cod produs: 12331837
Producator: Hecht
Categorie: GRADINA/Vermorele/Pulverizatoare electrice cu acumulator

Descriere: Pulverizatorul Hecht9415 iti ofera modalitatea cea mai simpla de a dezinfecta recoltele si plantatiile de dimensiuni mai mici. Este de mare ajutor in prevenirea bolilor recoltelor si la aparitia parazitilor. Practic, pulverizatorul este un dispozitiv destinat stropirii, pulverizarii si dispersarii ingrasamintelor sau substantelor menite sa asigure o recolta sanatoasa si de calitate.Specificatii:Bateria:Tensiune nominala: DC 40VTip baterie: Li-IonCapacitate: 2,5; 4,0; 5,0 AhProtectie pentru subtensiune: 28.5 ± 0.5 VTimpul de incarcare aprox: 120 min.Timpul de functionare: Max. 16 oreIncarcatorul:Tensiune intrare 220 / 240 VTensiune iesire: 40V DC 2AConditii de utilizare: 0 grade C / 35 gr …