Pulverizator electric HECHT 416ACCU, volum rezervor 15 litri, presiune 2.75 bar, acumulator 12 V, 7 Ah

Pulverizator electric HECHT 416ACCU, volum rezervor 15 litri, presiune 2.75 bar, acumulator 12 V, 7 Ah la doar 514.8 lei!

Cod produs: 12331840
Producator: Hecht
Categorie: GRADINA/Vermorele/Pulverizatoare electrice cu acumulator

Descriere: Pulverizatorul HECHT416ACCU iti ofera modalitatea cea mai simpla de a dezinfecta recoltele si plantatiile de dimensiuni mai mici. Este de mare ajutor in prevenirea bolilor recoltelor si la aparitia parazitilor.Practic, pulverizatorul este un dispozitiv destinat stropirii, pulverizarii si dispersarii ingrasamintelor sau substantelor menite sa asigure o recolta sanatoasa si de calitate.SpecificatiiBateriaTensiune nominala DC 12VTip baterie Li-IonCapacitate 7 AhIncarcare DC 12V / 1 – 2AProtectie pentru subtensiune 9,5 – 10 VTimpul de încarcare aprox. (ore) 8 – 8,5 hTimpul de functionare 4 hIncarcatorTensiune intrare AC 220 – 240 V / 50 HzTensiune iesire DC 12 V / 1,2 AConditii de utilizar …